-- --------------------------------------------------------
-- 主机:                           127.0.0.1
-- 服务器版本:                        5.6.35-log - MySQL Community Server (GPL)
-- 服务器操作系统:                      Win64
-- HeidiSQL 版本:                  9.5.0.5196
-- --------------------------------------------------------

/*!40101 SET @OLD_CHARACTER_SET_CLIENT=@@CHARACTER_SET_CLIENT */;
/*!40101 SET NAMES utf8 */;
/*!50503 SET NAMES utf8mb4 */;
/*!40014 SET @OLD_FOREIGN_KEY_CHECKS=@@FOREIGN_KEY_CHECKS, FOREIGN_KEY_CHECKS=0 */;
/*!40101 SET @OLD_SQL_MODE=@@SQL_MODE, SQL_MODE='NO_AUTO_VALUE_ON_ZERO' */;


-- 导出 stock_plan 的数据库结构
CREATE DATABASE IF NOT EXISTS `stock_plan` /*!40100 DEFAULT CHARACTER SET utf8 */;
USE `stock_plan`;

-- 导出  表 stock_plan.etf_day_info 结构
CREATE TABLE IF NOT EXISTS `etf_day_info` (
  `id` int(11) NOT NULL AUTO_INCREMENT,
  `code` varchar(50) DEFAULT NULL COMMENT '代码',
  `name` varchar(50) DEFAULT NULL COMMENT '名字',
  `amount` bigint(20) DEFAULT NULL COMMENT '成交额',
  `chg` double DEFAULT NULL COMMENT '涨跌额',
  `percent` double DEFAULT NULL COMMENT '涨跌幅',
  `volume` bigint(20) DEFAULT NULL COMMENT '成交量',
  `close` double DEFAULT NULL COMMENT '市价',
  `time_trade` varchar(50) DEFAULT NULL COMMENT '交易时间',
  PRIMARY KEY (`id`)
) ENGINE=InnoDB AUTO_INCREMENT=640561 DEFAULT CHARSET=utf8 COMMENT='etf基金日线数据';

-- 数据导出被取消选择。
/*!40101 SET SQL_MODE=IFNULL(@OLD_SQL_MODE, '') */;
/*!40014 SET FOREIGN_KEY_CHECKS=IF(@OLD_FOREIGN_KEY_CHECKS IS NULL, 1, @OLD_FOREIGN_KEY_CHECKS) */;
/*!40101 SET CHARACTER_SET_CLIENT=@OLD_CHARACTER_SET_CLIENT */;
